10^{-4}

10^{-3}

10^{-2}

10^{-3} 10^{-2} 10^{-1} 1 Sensitivity to sin^22θ_{13} 90Ψ CL vs. Δm^2 sin^22θ_{13}

Δm^2 (eV^2)

Shape+Counting Shape Only Counting Only